[{"question":"Should I use any cosmetics or make-up before my session?","answer":"Avoid Using any cosmetics, creams, or make-up before your session"},{"question":"How long should I avoid chemical peels or aesthetic treatments before the treatment?","answer":"Avoid chemical peels or aesthetic treatments for at least 15 days before your treatment"},{"question":"Are there any conditions or situations where the treatment should be avoided?","answer":"Avoid treatment if you are individuals with body implants, severe medical conditions, or if you\u2019ve undergone recent surgery. Consult our experts if you have any medical conditions or medical history."},{"question":"Is the facial treatment painless?","answer":"The facial treatment is generally painless, but you may experience pricking sensations at times."},{"question":"How soon will I notice instant radiance after the treatment?","answer":"The instant radiance you see after the treatment may vary depending on your skin type. You can expect a noticeable improvement in your skin 24-48 hours after the treatment"},{"question":"How long will the treatment last","answer":"Get a 45- day instant glow by following the after care tips. Notice improves signs on aging"},{"question":"Can I combine the treatment with chemical peels for better results?","answer":"For best results combining the treatment with suitable chemical peels is recommended"}]